\hypertarget{a02597}{
\section{mln::io::fits Namespace Reference}
\label{de/d94/a02597}\index{mln::io::fits@{mln::io::fits}}
}


Namespace of fits input/output handling.  


\subsection*{Functions}
\begin{DoxyCompactItemize}
\item 
void \hyperlink{a02597_a9f603d8a1141298f7d46915715f6fd4f}{load} (\hyperlink{a00248}{image2d}$<$ float $>$ \&ima, const std::string \&filename)
\begin{DoxyCompactList}\small\item\em Load a fits image in a Milena image. \item\end{DoxyCompactList}\item 
\hyperlink{a00248}{image2d}$<$ float $>$ \hyperlink{a02597_aa8990a633064c2e2fe6a64fdeac0319f}{load} (const std::string \&filename)
\begin{DoxyCompactList}\small\item\em Load a fits image in a image2d$<$float$>$. \item\end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
Namespace of fits input/output handling. 

\subsection{Function Documentation}
\hypertarget{a02597_a9f603d8a1141298f7d46915715f6fd4f}{
\index{mln::io::fits@{mln::io::fits}!load@{load}}
\index{load@{load}!mln::io::fits@{mln::io::fits}}
\subsubsection[{load}]{\setlength{\rightskip}{0pt plus 5cm}void mln::io::fits::load (
\begin{DoxyParamCaption}
\item[{image2d$<$ float $>$ \&}]{ ima, }
\item[{const std::string \&}]{ filename}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}inline\mbox{]}}}}
\label{de/d94/a02597_a9f603d8a1141298f7d46915715f6fd4f}


Load a fits image in a Milena image. 


\begin{DoxyParams}{Parameters}
\item[\mbox{\tt[out]} {\em ima}]A reference to the image2d$<$float$>$ which will receive data. \item[\mbox{\tt[in]} {\em filename}]The source. \end{DoxyParams}


Definition at line 132 of file fits/load.hh.

\hypertarget{a02597_aa8990a633064c2e2fe6a64fdeac0319f}{
\index{mln::io::fits@{mln::io::fits}!load@{load}}
\index{load@{load}!mln::io::fits@{mln::io::fits}}
\subsubsection[{load}]{\setlength{\rightskip}{0pt plus 5cm}{\bf image2d}$<$ float $>$ mln::io::fits::load (
\begin{DoxyParamCaption}
\item[{const std::string \&}]{ filename}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}inline\mbox{]}}}}
\label{de/d94/a02597_aa8990a633064c2e2fe6a64fdeac0319f}


Load a fits image in a image2d$<$float$>$. 


\begin{DoxyParams}{Parameters}
\item[\mbox{\tt[in]} {\em filename}]The image source.\end{DoxyParams}
\begin{DoxyReturn}{Returns}
An image2d$<$float$>$ which contains loaded data. 
\end{DoxyReturn}


Definition at line 85 of file fits/load.hh.

