\hypertarget{a02610}{
\section{mln::io::pbms Namespace Reference}
\label{de/d3b/a02610}\index{mln::io::pbms@{mln::io::pbms}}
}


Namespace of pbms input/output handling.  


\subsection*{Namespaces}
\begin{DoxyCompactItemize}
\item 
namespace \hyperlink{a02611}{impl}


\begin{DoxyCompactList}\small\item\em Namespace of pbms implementation details. \item\end{DoxyCompactList}

\end{DoxyCompactItemize}
\subsection*{Functions}
\begin{DoxyCompactItemize}
\item 
void \hyperlink{a02610_a29d4eaef43327a7681e0db8ed0cbba75}{load} (\hyperlink{a00043}{image3d}$<$ bool $>$ \&ima, const \hyperlink{a00027}{util::array}$<$ std::string $>$ \&filenames)
\begin{DoxyCompactList}\small\item\em Load pbms images as slices of a 3D Milena image. \item\end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
Namespace of pbms input/output handling. 

\subsection{Function Documentation}
\hypertarget{a02610_a29d4eaef43327a7681e0db8ed0cbba75}{
\index{mln::io::pbms@{mln::io::pbms}!load@{load}}
\index{load@{load}!mln::io::pbms@{mln::io::pbms}}
\subsubsection[{load}]{\setlength{\rightskip}{0pt plus 5cm}void mln::io::pbms::load (
\begin{DoxyParamCaption}
\item[{image3d$<$ bool $>$ \&}]{ ima, }
\item[{const util::array$<$ std::string $>$ \&}]{ filenames}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}inline\mbox{]}}}}
\label{de/d3b/a02610_a29d4eaef43327a7681e0db8ed0cbba75}


Load pbms images as slices of a 3D Milena image. 


\begin{DoxyParams}{Parameters}
\item[\mbox{\tt[out]} {\em ima}]A reference to the 3D image which will receive data. \item[\mbox{\tt[in]} {\em filenames}]The list of 2D images to load.. \end{DoxyParams}


Definition at line 65 of file pbms/load.hh.

