\hypertarget{a00193}{
\section{mln::fun::p2b::antilogy Struct Reference}
\label{dd/df4/a00193}\index{mln::fun::p2b::antilogy@{mln::fun::p2b::antilogy}}
}


A \hyperlink{a02556}{p2b} function always returning {\ttfamily false}.  




{\ttfamily \#include $<$antilogy.hh$>$}



Inheritance diagram for mln::fun::p2b::antilogy:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=390pt]{d9/d79/a03809}
\end{center}
\end{figure}


\subsection{Detailed Description}
A \hyperlink{a02556}{p2b} function always returning {\ttfamily false}. A simpler name would be `false', but this is not a valid C++ identifier, as {\ttfamily false} is a keyword of the language. 

Definition at line 50 of file antilogy.hh.

